0 250 500 750 1000 1250 1500

15:53

16:06

16:19

16:32

16:45

16:57

Frequency (Hz)

Time (UTC)

DA X Tilt Error Angle Power Spectrogram sh140805

0.01

0.02

0.05 0.1 0.2 0.5 1 2 5 10 20 50 100 200

0 250 500 750 1000 1250 1500

15:53

16:06

16:19

16:32

16:45

16:57

Frequency (Hz)

DA Y Tilt Error Angle Power Spectrogram sh140805

0.01

0.02

0.05 0.1 0.2 0.5 1 2 5 10 20 50 100 200