500 600 700 800 900 1000 1100 1200 0

0.5

1

1.5

wavenumber [cm^{-1} ]

NESR [mW / m 2 . sr . cm -1]

SHIS HBB NESR, 20150223T202028 - 20150223T210706 UTC

900 1000 1100 1200 1300 1400 1500 1600 1700 1800 1900 0

0.2

0.4

0.6

0.8

1

wavenumber [cm^{-1} ]

1800 2000 2200 2400 2600 2800 3000 0

0.05

0.1

0.15

0.2

0.25

wavenumber [cm^{-1} ]

NESR, total NESR, correlated NESR, uncorrelated