0 250 500 750 1000 1250 1500 0 100 200 DA Tilt Error Angle Power Spectrum Number of samples averaged: 10; flight date: 120913 time = 14.61 UTC Y X

0 250 500 750 1000 1250 1500 0 100 200 time = 14.63 UTC Y X

0 250 500 750 1000 1250 1500 0 100 200 time = 14.66 UTC Y X

0 250 500 750 1000 1250 1500 0 100 200 time = 14.68 UTC Y X

0 250 500 750 1000 1250 1500 0 100 200 time = 14.71 UTC Y X

0 250 500 750 1000 1250 1500 0

100 200 time = 14.75 UTC Y X